
\begin{block}{Mixing Time}
The smallest iteration number that is sufficient to obtain
a deviation lesser $\varepsilon$ between rows of $M$ and a given distribution.
\end{block}

\begin{block}{PRNG $\chi_{\textit{14Secrypt}}$}
\begin{algorithm}[H]
\begin{scriptsize}
\KwIn{a function $f$, an iteration number $b$, a \textit{Random} PRNG, an initial configuration $x^0$ ($n$ bits)}
\KwOut{a configuration $x$ ($n$ bits)}
$x\leftarrow x^0$\;
\For{$i=0,\dots,b-1$}
{
$s\leftarrow{\textit{Random}(n)}$\;
$x\leftarrow{F_f(s,x)}$\;
}
return $x$\;
\end{scriptsize}
\end{algorithm}
\begin{itemize}
\item From $x^0$: a random walk in $\Gamma(f)$ thanks to \textit{Random} 
  of length $b$
\end{itemize}
\end{block}



