X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/16dcc.git/blobdiff_plain/7e1869395799899be33ae9c59d7ddf936d3d5907..3434a6bb461a09975ace82f172dbf7ea647d882b:/prng.tex

diff --git a/prng.tex b/prng.tex
index b4f2059..8acfce7 100644
--- a/prng.tex
+++ b/prng.tex
@@ -186,7 +186,7 @@ achieve to pass the NIST battery of tests.
 
 
 
-\begin{table} 
+\begin{table*} 
 \renewcommand{\arraystretch}{1.3}
 \begin{center}
 \begin{scriptsize}
@@ -217,7 +217,7 @@ Linear Complexity& 0.719 (1.0)& 0.739 (0.99)& 0.759 (0.98)& 0.122 (0.97)& 0.514
 \end{center}
 \caption{NIST SP 800-22 test results ($\mathbb{P}_T$)}
 \label{The passing rate}
-\end{table}
+\end{table*}
 
 
 %%% Local Variables:
