X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/16dcc.git/blobdiff_plain/c7c7f9b7e2309f3817f329f4c1cd8d1588055370..705f6ebe2219797761eb1fd336de90f287787a29:/stopping.tex?ds=sidebyside

diff --git a/stopping.tex b/stopping.tex
index 989bb9e..e86176a 100644
--- a/stopping.tex
+++ b/stopping.tex
@@ -422,7 +422,7 @@ is realistic according the graph of $x \mapsto 2x\ln(2x+8)$.
 % \hline
 % \mathsf{N}  & 4 & 5 & 6 & 7& 8 & 9 & 10& 11 & 12 & 13 & 14 & 15 & 16 \\
 % \hline
-% \mathsf{N}  & 21.8 & 28.4 & 35.4 & 42.5 & 50 & 57.7 & 65.6& 73.5 & 81.6 & 90 & 98.3 & 107.1 & 16 \\
+% \mathsf{N}  & 21.8 & 28.4 & 35.4 & 42.5 & 50 & 57.7 & 65.6& 73.5 & 81.6 & 90 & 98.3 & 107.1 & 115.7 \\
 % \hline
 % \end{array}
 % $$
