X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES2stage.git/blobdiff_plain/0c77825b587a6051bceb28a3a8762f660f3c6c52..a0cf63f4131f16e0075ab94bbf53937fb998cca0:/paper.tex

diff --git a/paper.tex b/paper.tex
index 3b19b2d..64a88a8 100644
--- a/paper.tex
+++ b/paper.tex
@@ -669,8 +669,8 @@ called for a  maximum of $max\_iter_{kryl}$ iterations.  In practice, we  sugges
 equals to  the restart  number of the  GMRES-like method. Moreover,  a tolerance
 threshold must be specified for the  solver. In practice, this threshold must be
 much  smaller  than the  convergence  threshold  of  the TSIRM  algorithm  (\emph{i.e.}
-$\epsilon_{tsirm}$).  Line~\ref{algo:store}, $S_{k~ mod~ s}=x^k$ consists in copying the
-solution  $x_k$  into the  column  $k~ mod~ s$ of  the  matrix  $S$. After  the
+$\epsilon_{tsirm}$).  Line~\ref{algo:store}, $S_{k \mod s}=x^k$ consists in copying the
+solution  $x_k$  into the  column  $k \mod s$ of  the  matrix  $S$, where $S$ is a matrix of size $n\times s$ whose column vector $i$ is denoted by $S_i$. After  the
 minimization, the matrix $S$ is reused with the new values of the residuals.  To
 solve the minimization problem, an  iterative method is used. Two parameters are
 required for that: the maximum number of iterations and the threshold to stop the
@@ -686,13 +686,13 @@ Let us summarize the most important parameters of TSIRM:
 \end{itemize}
 
 
-The  parallelisation  of  TSIRM  relies   on  the  parallelization  of  all  its
+The  parallelization  of  TSIRM  relies   on  the  parallelization  of  all  its
 parts. More  precisely, except  the least-squares step,  all the other  parts are
 obvious to  achieve out in parallel. In  order to develop a  parallel version of
 our   code,   we   have   chosen  to   use   PETSc~\cite{petsc-web-page}.    For
 line~\ref{algo:matrix_mul} the  matrix-matrix multiplication is  implemented and
 efficient since the  matrix $A$ is sparse and since the  matrix $S$ contains few
-colums in  practice. As explained  previously, at least  two methods seem  to be
+columns in  practice. As explained  previously, at least  two methods seem  to be
 interesting to solve the least-squares minimization, CGLS and LSQR.
 
 In the following  we remind the CGLS algorithm. The LSQR  method follows more or
@@ -745,9 +745,7 @@ where $\alpha = \lambda_min(M)^2$ and $\beta = \lambda_max(A^T A)$, which proves
 the convergence of GMRES($m$) for all $m$ under that assumption regarding $A$.
 \end{proposition}
 
-<<<<<<< HEAD
 
-=======
 We can now claim that,
 \begin{proposition}
 If $A$ is a positive real matrix and GMRES($m$) is used as solver, then the TSIRM algorithm is convergent.
@@ -758,9 +756,16 @@ Let $r_k = b-Ax_k$, where $x_k$ is the approximation of the solution after the
 $k$-th iterate of TSIRM.
 We will prove that $r_k \rightarrow 0$ when $k \rightarrow +\infty$.
 
-Each step of the TSIRM algorithm 
+Each step of the TSIRM algorithm \\
+$\min_{\alpha \in \mathbb{R}^s} ||b-R\alpha ||_2 = \min_{\alpha \in \mathbb{R}^s} ||b-AS\alpha ||_2$
+
+$\begin{array}{ll}
+& = \min_{x \in Vect\left(x_0, x_1, \hdots, x_{k-1} \right)} ||b-AS\alpha ||_2\\
+& \leqslant \min_{x \in Vect\left( S_{k-1} \right)} ||b-Ax ||_2\\
+& \leqslant ||b-Ax_{k-1}||
+\end{array}$
 \end{proof}
->>>>>>> 84e15020344b77e5497c4a516cc20b472b2914cd
+
 
 %%%*********************************************************
 %%%*********************************************************
@@ -1064,4 +1069,3 @@ Curie and Juqueen respectively based in France and Germany.
 % that's all folks
 \end{document}
 
-
