X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES2stage.git/blobdiff_plain/12080b70975c1166b9faba747f271766a8c8dd75..3aa4a4a5934c50b8ee7ac223ae1ebc31796c820c:/paper.tex

diff --git a/paper.tex b/paper.tex
index e540970..2372b61 100644
--- a/paper.tex
+++ b/paper.tex
@@ -940,7 +940,7 @@ the number of iterations. So, the overall benefit of using TSIRM is interesting.
 \end{table*}
 
 
-In Table~\ref{tab:04}, some experiments with example ex54 on the Curie architecture are reported
+In Table~\ref{tab:04}, some experiments with example ex54 on the Curie architecture are reported.
 
 
 \begin{table*}[htbp]
