X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES2stage.git/blobdiff_plain/2fc464daa5a04774f5fa10bd96d36c53cc908a4a..299e2e52d19b38d91f622d1eb8b7af2bb44c7685:/paper.tex

diff --git a/paper.tex b/paper.tex
index 54e35d3..4757973 100644
--- a/paper.tex
+++ b/paper.tex
@@ -754,7 +754,7 @@ In order to see the influence of our algorithm with only one processor, we first
 show  a comparison  with the  standard version  of GMRES  and our  algorithm. In
 Table~\ref{tab:01},  we  show  the  matrices  we  have used  and  some  of  them
 characteristics. For all  the matrices, the name, the field,  the number of rows
-and the number of nonzero elements is given.
+and the number of nonzero elements are given.
 
 \begin{table}[htbp]
 \begin{center}
@@ -777,7 +777,7 @@ torso3             & 2D/3D problem & 259,156 & 4,429,042 \\
 
 The following  parameters have been chosen  for our experiments.   As by default
 the restart  of GMRES is performed every  30 iterations, we have  chosen to stop
-the GMRES every 30 iterations, $max\_iter_{kryl}=30$).  $s$ is set to 8. CGLS is
+the GMRES every 30 iterations (\emph{i.e.} $max\_iter_{kryl}=30$).  $s$ is set to 8. CGLS is
 chosen  to minimize  the least-squares  problem with  the  following parameters:
 $\epsilon_{ls}=1e-40$ and $max\_iter_{ls}=20$.  The external precision is set to
 $\epsilon_{tsirm}=1e-10$.  Those  experiments have been performed  on a Intel(R)
