X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES2stage.git/blobdiff_plain/534d3695d610fd2e8face91f6516d39e2473580d..ad91b931741db537cefe135f277f1fd5065db21f:/paper.tex

diff --git a/paper.tex b/paper.tex
index 463fe2c..6292705 100644
--- a/paper.tex
+++ b/paper.tex
@@ -943,7 +943,7 @@ the number of iterations. So, the overall benefit of using TSIRM is interesting.
 \end{table*}
 
 
-In Table~\ref{tab:04}, some experiments with example ex54 on the Curie architecture are reported
+In Table~\ref{tab:04}, some experiments with example ex54 on the Curie architecture are reported.
 
 
 \begin{table*}[htbp]
