X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES2stage.git/blobdiff_plain/61de3472de119515c917449ea4aea0a3240c8cb0..6fda575b88fae086f925cd4dcf960fc2af0d3b4f:/paper.tex

diff --git a/paper.tex b/paper.tex
index 4cd16c3..04ad634 100644
--- a/paper.tex
+++ b/paper.tex
@@ -965,6 +965,13 @@ In Table~\ref{tab:04}, some experiments with example ex54 on the Curie architect
 \end{center}
 \end{table*}
 
+\begin{figure}[htbp]
+\centering
+  \includegraphics[width=0.45\textwidth]{nb_iter_sec_ex54_curie}
+\caption{Number of iterations per second with ex54 and the same parameters than in Table~\ref{tab:05}}
+\label{fig:02}
+\end{figure}
+
 %%%*********************************************************
 %%%*********************************************************
 
