X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES2stage.git/blobdiff_plain/6f7da323faf523827b19731b7fcedde8f8e8fbea..d0f18e8e70d6e9c4404a5c5b5300f736ac4257c1:/paper.tex

diff --git a/paper.tex b/paper.tex
index 8085604..e3d19ec 100644
--- a/paper.tex
+++ b/paper.tex
@@ -897,7 +897,7 @@ corresponds to 30*12, there are $max\_iter_{ls}$ which corresponds to 15.
 \begin{figure}[htbp]
 \centering
   \includegraphics[width=0.45\textwidth]{nb_iter_sec_ex15_juqueen}
-\caption{Number of iterations per second with ex15 and the same parameters than in Table~\ref{tab:03}}
+\caption{Number of iterations per second with ex15 and the same parameters than in Table~\ref{tab:03} (weak scaling)}
 \label{fig:01}
 \end{figure}
 
@@ -965,6 +965,13 @@ In Table~\ref{tab:04}, some experiments with example ex54 on the Curie architect
 \end{center}
 \end{table*}
 
+\begin{figure}[htbp]
+\centering
+  \includegraphics[width=0.45\textwidth]{nb_iter_sec_ex54_curie}
+\caption{Number of iterations per second with ex54 and the same parameters than in Table~\ref{tab:05} (strong scaling)}
+\label{fig:02}
+\end{figure}
+
 %%%*********************************************************
 %%%*********************************************************
 
