X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES2stage.git/blobdiff_plain/a71cbaf8deace5aa6be2f43f9c2f97dab867a9b1..94bff40349bba73bd034821805ca870d73d148c9:/paper.tex

diff --git a/paper.tex b/paper.tex
index 98f208f..caf88ea 100644
--- a/paper.tex
+++ b/paper.tex
@@ -884,9 +884,10 @@ torso3             & 2D/3D problem & 259,156 & 4,429,042 \\
 \label{tab:01}
 \end{center}
 \end{table}
-Chosen parameters  are detailed below.   As by default  the restart of  GMRES is
-performed  every 30  iterations,  we have  chosen  to stop  the  GMRES every  30
-iterations (\emph{i.e.} $max\_iter_{kryl}=30$).  $s$ is set to 8. CGLS is chosen
+Chosen parameters  are detailed below.   
+We have  chosen  to stop  the  GMRES every  30
+iterations (\emph{i.e.}, $max\_iter_{kryl}=30$), which is the default 
+setting of GMRES.  $s$, for its part, has been set to 8. CGLS is chosen
 to   minimize  the   least-squares  problem   with  the   following  parameters:
 $\epsilon_{ls}=1e-40$ and $max\_iter_{ls}=20$.  The external precision is set to
 $\epsilon_{tsirm}=1e-10$.  Those  experiments have been performed  on a Intel(R)
