X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES2stage.git/blobdiff_plain/a71cbaf8deace5aa6be2f43f9c2f97dab867a9b1..dfdee1f9086e9574b81e615edd998441ed3b82ae:/paper.tex

diff --git a/paper.tex b/paper.tex
index 98f208f..c8305c5 100644
--- a/paper.tex
+++ b/paper.tex
@@ -884,13 +884,14 @@ torso3             & 2D/3D problem & 259,156 & 4,429,042 \\
 \label{tab:01}
 \end{center}
 \end{table}
-Chosen parameters  are detailed below.   As by default  the restart of  GMRES is
-performed  every 30  iterations,  we have  chosen  to stop  the  GMRES every  30
-iterations (\emph{i.e.} $max\_iter_{kryl}=30$).  $s$ is set to 8. CGLS is chosen
-to   minimize  the   least-squares  problem   with  the   following  parameters:
+Chosen parameters  are detailed below.   
+We have  stopped  the  GMRES every  30
+iterations (\emph{i.e.}, $max\_iter_{kryl}=30$), which is the default 
+setting of GMRES.  $s$, for its part, has been set to 8. CGLS 
+ minimizes  the   least-squares  problem   with  parameters
 $\epsilon_{ls}=1e-40$ and $max\_iter_{ls}=20$.  The external precision is set to
-$\epsilon_{tsirm}=1e-10$.  Those  experiments have been performed  on a Intel(R)
-Core(TM) i7-3630QM CPU @ 2.40GHz with the version 3.5.1 of PETSc.
+$\epsilon_{tsirm}=1e-10$.  These  experiments have been performed  on an Intel(R)
+Core(TM) i7-3630QM CPU @ 2.40GHz with the 3.5.1 version  of PETSc.
 
 
 In  Table~\ref{tab:02}, some  experiments comparing  the solving  of  the linear
