X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES2stage.git/blobdiff_plain/a98e8c38421b61f2afb89fa180eb8b8f8989be51..176107a654cef5a1e3e376218e5da656e515453b:/paper.tex

diff --git a/paper.tex b/paper.tex
index 4086a0e..18340f6 100644
--- a/paper.tex
+++ b/paper.tex
@@ -768,9 +768,8 @@ the restart  of GMRES is performed every  30 iterations, we have  chosen to stop
 the GMRES every 30 iterations, $max\_iter_{kryl}=30$).  $s$ is set to 8. CGLS is
 chosen  to minimize  the least-squares  problem with  the  following parameters:
 $\epsilon_{ls}=1e-40$ and $max\_iter_{ls}=20$.  The external precision is set to
-$1e-10$  (i.e. ).   Those experiments
-have been  performed on  a Intel(R)  Core(TM) i7-3630QM CPU  @ 2.40GHz  with the
-version 3.5.1 of PETSc.
+$\epsilon_{tsarm}=1e-10$.  Those  experiments have been performed  on a Intel(R)
+Core(TM) i7-3630QM CPU @ 2.40GHz with the version 3.5.1 of PETSc.
 
 
 In  Table~\ref{tab:02}, some  experiments comparing  the solving  of  the linear
