X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES2stage.git/blobdiff_plain/f2b93de905ad07c8701e6cc195e12da13406d8f3..96dcb243cd0224275446d6d85fab46ed72241a22:/paper.tex

diff --git a/paper.tex b/paper.tex
index ef0321c..9035059 100644
--- a/paper.tex
+++ b/paper.tex
@@ -823,13 +823,13 @@ which concludes the induction and the proof.
 \label{sec:05}
 
 
-In order to see the influence of our algorithm with only one processor, we first
-show a comparison with GMRES or FGMRES and our algorithm. In Table~\ref{tab:01},
-we  show the  matrices we  have  used and  some of  them characteristics.  Those
-matrices  are   chosen  from   the  Davis  collection   of  the   University  of
-Florida~\cite{Dav97}. They are matrices arising in real-world applications.  For
-all the  matrices, the name,  the field,  the number of  rows and the  number of
-nonzero elements are given.
+In order to see the behavior of the proposal when considering only one processor, a first
+comparison with GMRES or FGMRES and the new algorithm detailed previously has been experimented. 
+Matrices that have been used with their characteristics (names, fields, rows, and nonzero coefficients) are detailed in 
+Table~\ref{tab:01}.  These latter, which are real-world applications matrices, 
+have been extracted 
+ from   the  Davis  collection,   University  of
+Florida~\cite{Dav97}.
 
 \begin{table}[htbp]
 \begin{center}
@@ -849,8 +849,9 @@ torso3             & 2D/3D problem & 259,156 & 4,429,042 \\
 \label{tab:01}
 \end{center}
 \end{table}
-
-The following  parameters have been chosen  for our experiments.   As by default
+Chosen parameters are detailed below.
+%The following  parameters have been chosen  for our experiments.   
+As by default
 the restart  of GMRES is performed every  30 iterations, we have  chosen to stop
 the GMRES every 30 iterations (\emph{i.e.} $max\_iter_{kryl}=30$).  $s$ is set to 8. CGLS is
 chosen  to minimize  the least-squares  problem with  the  following parameters:
@@ -930,8 +931,16 @@ by core. The Juqueen architecture is composed  of IBM PowerPC A2 at 1.6 GHz with
 speed network.
 
 
+In  many situations, using  preconditioners is  essential in  order to  find the
+solution of a linear system.  There are many preconditioners available in PETSc.
+For parallel applications all  the preconditioners based on matrix factorization
+are  not  available. In  our  experiments, we  have  tested  different kinds  of
+preconditioners, however  as it is  not the subject  of this paper, we  will not
+present results with many preconditioners. In  practise, we have chosen to use a
+multigrid (mg)  and successive  over-relaxation (sor). For  more details  on the
+preconditioner in PETSc please consult~\cite{petsc-web-page}.
+
 
-{\bf Description of preconditioners}\\
 
 \begin{table*}[htbp]
 \begin{center}
