X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES2stage.git/blobdiff_plain/fb76712d242729273110c7f99637e0e8d28ee66e..28a69d2ef176b29e8ebe7ef14296d8e9474e4ebc:/IJHPCN/paper.tex

diff --git a/IJHPCN/paper.tex b/IJHPCN/paper.tex
index c812535..8cc8108 100644
--- a/IJHPCN/paper.tex
+++ b/IJHPCN/paper.tex
@@ -938,6 +938,20 @@ cores to more than 16 with 8,192 cores.
 \label{fig:max_inner_time} 
 \end{figure}
 
+\begin{figure}[htbp]
+\centering
+  \includegraphics[angle=-90,width=0.5\textwidth]{ksp_tsirm_maxiter_ls_iter}
+\caption{Number of total iterations with variation of number of iterations in the minimization process.}
+\label{fig:maxiter_ls_iter} 
+\end{figure}
+
+\begin{figure}[htbp]
+\centering
+  \includegraphics[angle=-90,width=0.5\textwidth]{ksp_tsirm_maxiter_ls_time}
+\caption{Execution time in seconds with variation of number of iterations in the minimization process.}
+\label{fig:maxiter_ls_time} 
+\end{figure}
+
 %%ENDNEW
 
 
