X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES_For_Journal.git/blobdiff_plain/5853bb7d8ed1c9a4132d4a47811f3d276ccdf993..4213a1b162b882b6f5c6e0e648883cdf132530aa:/GMRES_Journal.tex

diff --git a/GMRES_Journal.tex b/GMRES_Journal.tex
index 4dd9808..84957d8 100644
--- a/GMRES_Journal.tex
+++ b/GMRES_Journal.tex
@@ -923,7 +923,7 @@ torso3            & 57.469 s       & 16.828 s     & {\bf 3.415}   & 926.588 s
 
 \begin{figure}
 \centering
-  \includegraphics[width=120mm,keepaspectratio]{weak}
+  \includegraphics[width=120mm,keepaspectratio]{Figures/weak}
 \caption{Weak scaling of the parallel GMRES algorithm on a GPU cluster.}
 \label{fig:09}
 \end{figure}
