X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/GMRES_For_Journal.git/blobdiff_plain/bf13b1d1a5d1eb9946b18dc9034f5800fd991106..d164a3ea8701e61dd439dcf53021079d7116d8f6:/GMRES_Journal.tex?ds=sidebyside

diff --git a/GMRES_Journal.tex b/GMRES_Journal.tex
index 0ca22df..cd0af72 100644
--- a/GMRES_Journal.tex
+++ b/GMRES_Journal.tex
@@ -874,7 +874,7 @@ crashbasis        & 48.532 s       & 3195.183 s   & {\bf 0.015}   & 623.686 s
 FEM\_3D\_thermal2 & 37.211 s       & 1584.650 s   & {\bf 0.023}   & 370.297 s      & 3810.255 s   & {\bf 0.097}\\
 language          & 22.912 s       & 2242.897 s   & {\bf 0.010}   & 286.682 s      & 5348.733 s   & {\bf 0.054}\\
 poli\_large       & 13.618 s       & 1722.304 s   & {\bf 0.008}   & 190.302 s      & 4059.642 s   & {\bf 0.047}\\
-torso3            & 74.194 s       & 4454.936 s   & {\bf 0.017}   & 190.302 s      & 10800.787 s  & {\bf 0.083}\\ \hline       
+torso3            & 74.194 s       & 4454.936 s   & {\bf 0.017}   & 897.440 s      & 10800.787 s  & {\bf 0.083}\\ \hline       
 \end{tabular}
 \caption{Ratios of the computation time over the communication time obtained from the parallel GMRES algorithm using row-by-row partitioning on 12 GPUs and 24 CPUs.}
 \label{tab:10}
