X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/JournalMultiPeriods.git/blobdiff_plain/46e6f7cd7d85049c4f767edfe1091ef287cdc1e0..8029b7a5810c94a0bf1f2e0b4b37432a875a5015:/article.tex

diff --git a/article.tex b/article.tex
index b37791f..99b5e0e 100644
--- a/article.tex
+++ b/article.tex
@@ -1401,7 +1401,7 @@ Comparison shows that Model-5, which uses less number of primary points, is the
 %\end{enumerate}
 
 
-%\subsection{Results and analysis}
+\subsection{Comparison Results}
 
 \subsubsection{Coverage ratio} 
 
