X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/JournalMultiPeriods.git/blobdiff_plain/acf040f3efe85387361514b1973192ad14dc0e1b..2ba5b97f1d69b58718422c04baddd310c86043ee:/article.tex

diff --git a/article.tex b/article.tex
index 6f86616..0881da1 100644
--- a/article.tex
+++ b/article.tex
@@ -1392,7 +1392,7 @@ rounds, and thus should extend the network lifetime.
 
 \begin{figure}[ht!]
 \centering
- \includegraphics[scale=0.5] {R/CR.pdf} 
+ \includegraphics[scale=0.5] {F/CR.pdf} 
 \caption{Average coverage ratio for 150 deployed nodes}
 \label{fig3}
 \end{figure} 
@@ -1418,7 +1418,7 @@ Obviously, in that case DESK  and GAF have less active nodes, since  they have a
 
 \begin{figure}[ht!]
 \centering
-\includegraphics[scale=0.5]{R/ASR.pdf}  
+\includegraphics[scale=0.5]{F/ASR.pdf}  
 \caption{Active sensors ratio for 150 deployed nodes}
 \label{fig4}
 \end{figure} 
@@ -1442,7 +1442,7 @@ Let us emphasize that the  simulation continues as long as a network  in a subre
 
 \begin{figure}[ht!]
 \centering
-\includegraphics[scale=0.5]{R/SR.pdf} 
+\includegraphics[scale=0.5]{F/SR.pdf} 
 \caption{Cumulative percentage of stopped simulation runs for 150 deployed nodes }
 \label{fig6}
 \end{figure} 
@@ -1458,9 +1458,9 @@ network sizes, for $Lifetime_{95}$ and $Lifetime_{50}$.
 \begin{figure}[h!]
   \centering
   \begin{tabular}{cl}
-    \parbox{9.5cm}{\includegraphics[scale=0.5]{R/EC95.pdf}} & (a) \\
+    \parbox{9.5cm}{\includegraphics[scale=0.5]{F/EC95.pdf}} & (a) \\
     \verb+ + \\
-    \parbox{9.5cm}{\includegraphics[scale=0.5]{R/EC50.pdf}} & (b)
+    \parbox{9.5cm}{\includegraphics[scale=0.5]{F/EC50.pdf}} & (b)
   \end{tabular}
   \caption{Energy consumption for (a) $Lifetime_{95}$ and 
     (b) $Lifetime_{50}$}
@@ -1492,7 +1492,7 @@ for different network sizes.
 
 \begin{figure}[ht!]
 \centering
-\includegraphics[scale=0.5]{R/T.pdf}  
+\includegraphics[scale=0.5]{F/T.pdf}  
 \caption{Execution Time (in seconds)}
 \label{fig77}
 \end{figure} 
@@ -1531,9 +1531,9 @@ linked.
 \begin{figure}[t!]
   \centering
   \begin{tabular}{cl}
-    \parbox{9.5cm}{\includegraphics[scale=0.5]{R/LT95.pdf}} & (a) \\
+    \parbox{9.5cm}{\includegraphics[scale=0.5]{F/LT95.pdf}} & (a) \\
     \verb+ + \\
-    \parbox{9.5cm}{\includegraphics[scale=0.5]{R/LT50.pdf}} & (b)
+    \parbox{9.5cm}{\includegraphics[scale=0.5]{F/LT50.pdf}} & (b)
   \end{tabular}
   \caption{Network lifetime for (a) $Lifetime_{95}$ and 
     (b) $Lifetime_{50}$}
