X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/JournalMultiPeriods.git/blobdiff_plain/b0d04b7c6e548a308c804a66d2805f8e82fcd753..01aef364b44f686503abfe937ebe9face8ef1f4c:/article.tex

diff --git a/article.tex b/article.tex
index f8f7ec4..9625e1e 100644
--- a/article.tex
+++ b/article.tex
@@ -1132,7 +1132,7 @@ $W_{U}$ & $|P|^2$ \\
   
 \textcolor{red}{Our first protocol based GLPK optimization solver is declined into  four versions: MuDiLCO-1,  MuDiLCO-3, MuDiLCO-5,
 and  MuDiLCO-7, corresponding  respectively to  $T=1,3,5,7$ ($T$  the  number of rounds in one sensing period).
-The second protocol based  based GLPK optimization solver with time limit is declined into  four versions: TL-MuDiLCO-1,  TL-MuDiLCO-3, TL-MuDiLCO-5, and  TL-MuDiLCO-7. Table \ref{tl} shows time limit values for TL-MuDiLCO protocol versions. After extensive experiments, we chose the values that explained in Table \ref{tl} because they gave the best results. In Table \ref{tl}, "NO" refers to apply the GLPK solver without time limit because we did not find improvement on the results of MuDiLCO protocol with the time limit}. 
+The second protocol based  based GLPK optimization solver with time limit is declined into  four versions: TL-MuDiLCO-1,  TL-MuDiLCO-3, TL-MuDiLCO-5, and  TL-MuDiLCO-7. Table \ref{tl} shows time limit values for TL-MuDiLCO protocol versions. After extensive experiments, we chose the values that explained in Table \ref{tl} because they gave the best results. In these experiments, we started with the average execution time of the corresponding MuDiLCO version and network size divided by 3 as a time limit. After that, we increase these values until reaching the best results. In Table \ref{tl}, "NO" refers to apply the GLPK solver without time limit because we did not find improvement on the results of MuDiLCO protocol with the time limit.  }. 
 
 \begin{table}[ht]
 \caption{Time limit values for TL-MuDiLCO protocol versions }
@@ -1145,11 +1145,11 @@ The second protocol based  based GLPK optimization solver with time limit is dec
  \hline
 100 & NO & NO & NO & NO \\
 \hline
-150 & NO & 0.006 & NO & 0.03 \\
+150 & NO & NO & NO & 0.03 \\
 \hline
-200 & 0.0035 & 0.0094 & 0.020 & 0.06 \\
+200 & NO & 0.0094 & 0.020 & 0.06 \\
  \hline
- 250 & 0.0055 & 0.013 & 0.03 & 0.08 \\
+ 250 & NO & 0.013 & 0.03 & 0.08 \\
  \hline
 \end{tabular}
 
