X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/JournalMultiPeriods.git/blobdiff_plain/ec3eb1e7f256da3a709bb498434bd5c8f6b87c38..19602d4d3b1c4c79a38b704ee7b72f845857978c:/article.tex

diff --git a/article.tex b/article.tex
index e32ed72..00a0b35 100644
--- a/article.tex
+++ b/article.tex
@@ -989,7 +989,7 @@ randomly from the population. Find the worst from them and then check its fitnes
 
  
 \item \textcolor{red}{\textbf{Stopping criteria:}
-The proposed GA-MuDiLCO stops when the stopping criteria is met. It stops after running for an amount of time in seconds equal to \textbf{Time limit}. The \textbf{Time limit} is the execution time obtained by the optimization solver GLPK for solving the same size of problem divided by two. The best solution will be selected as a schedule of sensors for $T$ rounds during the sensing phase in the current period.}
+The proposed GA-MuDiLCO stops when the stopping criteria is met. It stops after running for an amount of time in seconds equal to \textbf{Time limit}. The \textbf{Time limit} is the execution time obtained by the optimization solver GLPK for solving the same size of problem. The best solution will be selected as a schedule of sensors for $T$ rounds during the sensing phase in the current period.}
 
 
 
