X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/Krylov_multi.git/blobdiff_plain/abcdf8bc25415152bc75bdc02849ccd865d7fac1..3fb90f456c32d2da370ab529612496460174a0bb:/Revision.tex?ds=sidebyside

diff --git a/Revision.tex b/Revision.tex
index 4b4ffe3..0ccf1a3 100644
--- a/Revision.tex
+++ b/Revision.tex
@@ -85,6 +85,6 @@ Section 4 has been rewritten in order to explain our choice to compare our Krylo
 \item ``Was the method of reference [9] implemented by the authors of [9]? How did they do against GMRES?''
 
 \medskip
-As explained in the paper, authors of [9] have not implemented the method of reference [9]. They have mainly focused on the convergence analysis of various forms of the algorithm [9] and presented results of numerical examples on a sequential computer. 
+As explained in the paper, authors of [9] have not implemented the method of reference [9]. They have mainly focused on the convergence analysis of various forms of the algorithm [9] and presented simulations of numerical examples on a sequential computer. 
 \end{enumerate}
 \end{document} 
