X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/LiCO.git/blobdiff_plain/1730ca37e00cce6bd1ad7cf3cd23eb3cb397bc35..20aa226716ebbb3990da53146f469c6b56bc617f:/PeCO-EO/articleeo.tex?ds=inline

diff --git a/PeCO-EO/articleeo.tex b/PeCO-EO/articleeo.tex
index bb97acb..ba033ea 100644
--- a/PeCO-EO/articleeo.tex
+++ b/PeCO-EO/articleeo.tex
@@ -974,7 +974,7 @@ sensor-testbed to evaluate it in real world applications.
 
 
 \subsection{Acknowledgements}
-The authors are deeply grateful to the anonymous reviewers for their constructive advice, which improved the technical quality of the paper. As a  Ph.D.   student, Ali Kadhum IDREES  would  like to  gratefully acknowledge the  University of Babylon -  IRAQ for financial support  and Campus France for the  received support. This work is also partially funded by the Labex ACTION program (contract ANR-11-LABX-01-01). 
+The authors are deeply grateful to the anonymous reviewers for their constructive advice, which improved the technical quality of the paper. As a  Ph.D.   student, Ali Kadhum IDREES  would  like to  gratefully acknowledge the  University of Babylon - Iraq for financial support  and Campus France for the  received support. This work is also partially funded by the Labex ACTION program (contract ANR-11-LABX-01-01). 
 
 \bibliographystyle{gENO}
 \bibliography{biblio} %articleeo
