X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/LiCO.git/blobdiff_plain/20aa226716ebbb3990da53146f469c6b56bc617f..da714d3089e2f51ac43384a5a4be61a5f587bffc:/PeCO-EO/articleeo.tex?ds=inline

diff --git a/PeCO-EO/articleeo.tex b/PeCO-EO/articleeo.tex
index ba033ea..eea6591 100644
--- a/PeCO-EO/articleeo.tex
+++ b/PeCO-EO/articleeo.tex
@@ -15,13 +15,12 @@
 \title{{\itshape Perimeter-based Coverage Optimization to Improve Lifetime \\
     in Wireless Sensor Networks}}
 
-\author{Ali Kadhum Idrees$^{a, b}$, Karine Deschinkel$^{a}$$^{\ast}$\thanks{$^\ast$Corresponding author. Email: karine.deschinkel@univ-fcomte.fr}, Michel Salomon$^{a}$ and Rapha\"el Couturier $^{a}$
-$^{a}${\em{FEMTO-ST Institute, UMR 6174 CNRS, University of Franche-Comt\'e,
-          Belfort, France}}
-$^{b}${\em{Department of Computer Science, University of Babylon, Babylon, Iraq}} }         
-          
-        
-
+\author{Ali Kadhum Idrees$^{a,b}$, Karine Deschinkel$^{a}$$^{\ast}$\thanks{$^\ast$Corresponding author. Email: karine.deschinkel@univ-fcomte.fr}, Michel Salomon$^{a}$ and Rapha\"el Couturier $^{a}$
+  $^{a}${\em{FEMTO-ST Institute, UMR 6174 CNRS, \\
+  University Bourgogne Franche-Comt\'e (UBFC), Belfort, France}} \\ 
+  $^{b}${\em{Department of Computer Science, University of Babylon, Babylon, Iraq}}
+}         
+         
 \maketitle
 
 \begin{abstract}
@@ -309,7 +308,7 @@ above is thus given by the sixth line of the table.
 
 \begin{figure*}[t!]
 \centering
-\includegraphics[width=0.95\linewidth]{figure2.eps}  
+\includegraphics[width=0.9\linewidth]{figure2.eps}  
 \caption{Maximum coverage levels for perimeter of sensor node $0$.}
 \label{figure2}
 \end{figure*} 
@@ -392,7 +391,7 @@ of the application.
 
 \begin{figure}[t!]
 \centering
-\includegraphics[width=85mm]{figure4.eps}  
+\includegraphics[width=80mm]{figure4.eps}  
 \caption{PeCO protocol.}
 \label{figure4}
 \end{figure} 
