X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/LiCO.git/blobdiff_plain/69295a437968b7724acd8bc875a6b8943817854a..b62ec84b902a724ab98a9943a0428282aab20fc7:/PeCO-EO/articleeo.tex?ds=inline

diff --git a/PeCO-EO/articleeo.tex b/PeCO-EO/articleeo.tex
index 0acbf9b..4bde88c 100644
--- a/PeCO-EO/articleeo.tex
+++ b/PeCO-EO/articleeo.tex
@@ -289,8 +289,8 @@ arcs.
 \begin{figure}[ht!]
   \centering
   \begin{tabular}{@{}cr@{}}
-    \includegraphics[width=75mm]{figure1a.tiff} & \raisebox{3.25cm}{(a)} \\
-    \includegraphics[width=75mm]{figure1b.tiff} & \raisebox{2.75cm}{(b)}
+    \includegraphics[width=75mm]{figure1a.eps} & \raisebox{3.25cm}{(a)} \\
+    \includegraphics[width=75mm]{figure1b.eps} & \raisebox{2.75cm}{(b)}
   \end{tabular}
   \caption{(a) Perimeter  coverage of sensor node  0 and (b) finding  the arc of
     $u$'s perimeter covered by $v$.}
@@ -335,7 +335,7 @@ above is thus given by the sixth line of the table.
 
 \begin{figure*}[t!]
 \centering
-\includegraphics[width=127.5mm]{figure2.tiff}  
+\includegraphics[width=127.5mm]{figure2.eps}  
 \caption{Maximum coverage levels for perimeter of sensor node $0$.}
 \label{expcm}
 \end{figure*} 
@@ -385,7 +385,7 @@ optimization algorithm.
  
 \begin{figure}[h!]
 \centering
-\includegraphics[width=62.5mm]{figure3.tiff}  
+\includegraphics[width=62.5mm]{figure3.eps}  
 \caption{Sensing range outside the WSN's area of interest.}
 \label{ex4pcm}
 \end{figure} 
@@ -424,7 +424,7 @@ the area.
 
 \begin{figure}[t!]
 \centering
-\includegraphics[width=80mm]{figure4.tiff}  
+\includegraphics[width=80mm]{figure4.eps}  
 \caption{PeCO protocol.}
 \label{fig2}
 \end{figure} 
