X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/LiCO.git/blobdiff_plain/812edb340b2eb0bf97c29142124c5a4335a703c8..2b16e2d89b01a6fdda8ae3ccfe3b8fb7085c4dcb:/PeCO-EO/reponse.tex

diff --git a/PeCO-EO/reponse.tex b/PeCO-EO/reponse.tex
index 02e456e..9d11094 100644
--- a/PeCO-EO/reponse.tex
+++ b/PeCO-EO/reponse.tex
@@ -169,7 +169,7 @@ suggest using the journals template to adjust them for overall consistency.\\
     WSN. Each  paragraph of this Section  discusses the literature related  to a
     particular aspect of the problem : 1. types of coverage, 2. types of scheme,
     3. centralized versus distributed protocols,  4. optimization method. At the
-    end of each paragraph we position our approach.}}\\
+    end of each paragraph we position our approach. We have also added a last paragraph about our previous work on DilCO protocol to explain the difference with PeCO. }}\\
 
 \noindent {\bf 7.} The methodology is implemented in OMNeT++ (network simulator)
 and tested  against 2 existing algorithms  and a previously developed  method by
