X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/LiCO.git/blobdiff_plain/a2d993a3268c260445a6fcb9a5f04f9a7d30ae78..cb151d3544ce08c9c270b4dcd4201e2520900e5e:/LiCO_Journal.tex

diff --git a/LiCO_Journal.tex b/LiCO_Journal.tex
index 4cabd73..a714974 100644
--- a/LiCO_Journal.tex
+++ b/LiCO_Journal.tex
@@ -378,7 +378,7 @@ above is thus given by the sixth line of the table.
 
 \begin{figure*}[ht!]
 \centering
-\includegraphics[width=137.5mm]{expcm.pdf}  
+\includegraphics[width=137.5mm]{expcm2.jpg}  
 \caption{Maximum coverage levels for perimeter of sensor node $0$.}
 \label{expcm}
 \end{figure*} 
