X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/LiCO.git/blobdiff_plain/b9b0f889622d304376ba7fa4f355e1eba7481ae9..73e53d1f06e64810f4377d33b8842500aa570382:/LiCO_Journal.tex?ds=inline

diff --git a/LiCO_Journal.tex b/LiCO_Journal.tex
index ad465b3..38f9e9e 100644
--- a/LiCO_Journal.tex
+++ b/LiCO_Journal.tex
@@ -821,7 +821,6 @@ one,  called  DESK,  is  a  fully distributed  coverage  algorithm  proposed  by
 \cite{ChinhVu}. The second one,  called GAF~\cite{xu2001geography}, consists in
 dividing  the monitoring  area into  fixed  squares. Then,  during the  decision
 phase, in each square, one sensor is  chosen to remain active during the sensing
-%%RC can we download DILCO?
 phase. The last  one, the DiLCO protocol~\cite{Idrees2}, is  an improved version
 of a research work we presented in~\cite{idrees2014coverage}. Let us notice that
 LiCO and  DiLCO protocols are  based on the  same framework. In  particular, the
