X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/Sensornets15.git/blobdiff_plain/cec3b1150a4effa0c5b6c66627d74813226f79eb..580cdb46c36444138f980cce874e98bde7a3a14f:/Example.tex?ds=sidebyside

diff --git a/Example.tex b/Example.tex
index 29cd9c6..ab41cfc 100644
--- a/Example.tex
+++ b/Example.tex
@@ -55,11 +55,12 @@ email: ali.idness@edu.univ-fcomte.fr,\\ $\lbrace$karine.deschinkel, michel.salom
   scheduling  performed by  each elected  leader.  This  two-step process  takes
   place periodically, in  order to choose a small set  of nodes remaining active
   for sensing during a time slot.  Each set is built to ensure coverage at a low
-  energy cost,  allowing to optimize  the network lifetime.  %More  precisely, a
+  energy cost,  allowing to optimize  the network lifetime.  
+%More  precisely, a
   %period  consists  of  four   phases:  (i)~Information  Exchange,  (ii)~Leader
   %Election,  (iii)~Decision, and  (iv)~Sensing.   The  decision process,  which
-  results in  an activity  scheduling vector,  is carried out  by a  leader node
-  through the solving of an integer program.
+%  results in  an activity  scheduling vector,  is carried out  by a  leader node
+%  through the solving of an integer program.
 % MODIF - BEGIN
   Simulations are conducted using the discret event simulator
   OMNET++.  We  refer to the characterictics  of a Medusa II  sensor for
@@ -712,7 +713,7 @@ nodes, and thus enables the extension of the network lifetime.
 \parskip 0pt    
 \begin{figure}[t!]
 \centering
- \includegraphics[scale=0.45] {R/CR.pdf} 
+ \includegraphics[scale=0.45] {CR.pdf} 
 \caption{Coverage ratio}
 \label{fig3}
 \end{figure} 
@@ -733,7 +734,7 @@ used for the different performance metrics.
 
 \begin{figure}[h!]
 \centering
-\includegraphics[scale=0.45]{R/EC.pdf} 
+\includegraphics[scale=0.45]{EC.pdf} 
 \caption{Energy consumption per period}
 \label{fig95}
 \end{figure} 
@@ -769,7 +770,7 @@ Figure~\ref{fig8}.
 
 \begin{figure}[h!]
 \centering
-\includegraphics[scale=0.45]{R/T.pdf}  
+\includegraphics[scale=0.45]{T.pdf}  
 \caption{Execution time in seconds}
 \label{fig8}
 \end{figure} 
@@ -796,7 +797,7 @@ network lifetime.
 
 \begin{figure}[h!]
 \centering
-\includegraphics[scale=0.45]{R/LT.pdf}  
+\includegraphics[scale=0.45]{LT.pdf}  
 \caption{Network lifetime}
 \label{figLT95}
 \end{figure} 
