X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAhmed.git/blobdiff_plain/18280a326d3fbcc20a96c315709b73e844887f46..399ba08408333d926285a5769d30aa91c8d5a120:/thesis-presentation/AhmedSlides.tex

diff --git a/thesis-presentation/AhmedSlides.tex b/thesis-presentation/AhmedSlides.tex
index 50ac984..9bb4b6f 100644
--- a/thesis-presentation/AhmedSlides.tex
+++ b/thesis-presentation/AhmedSlides.tex
@@ -147,9 +147,7 @@
 %%    SLIDE 04   %%
 %%%%%%%%%%%%%%%%%%%% 
 \begin{frame}{Techniques for energy consumption reduction}
- \vspace{0.1cm}
- 
- 
+
      \textcolor{blue}{1)} \bf \textcolor{black}{Switch-off idle nodes method}  
     \vspace{-0.9cm}
     \begin{figure}
@@ -164,7 +162,7 @@
 \begin{frame}{Techniques for energy consumption reduction}
  
   \textcolor{blue}{2)} \bf \textcolor{black}{Dynamic voltage and frequency Scaling (DVFS)}
-     \vspace{-0.5cm}
+     \vspace{-0.9cm}
     \begin{figure}
     \animategraphics[autopause,controls,scale=0.25,buttonsize=0.2cm]{10}{DVFS-meq/a-}{0}{109}
      %\includegraphics[width=0.6\textwidth]{DVFS-meq/a-109}
