X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAhmed.git/blobdiff_plain/7b4f492a307bee60f4dfc90adb0aee0bad5f48ed..HEAD:/CHAPITRE_01.tex?ds=sidebyside

diff --git a/CHAPITRE_01.tex b/CHAPITRE_01.tex
index cc23717..306bcf7 100644
--- a/CHAPITRE_01.tex
+++ b/CHAPITRE_01.tex
@@ -652,7 +652,7 @@ There are two drawbacks in this energy model as follows:
       types of  processors, which  consume different dynamic and static powers. 
 \end{itemize}
 
-Therefore, one of the more important goals of this work is to develop a new energy models that 
+Therefore, one of the most important goals of this work is to develop a new energy models that 
  take into consideration the communication times in addition to the  computation times in order to modelize and measure the energy consumptions of the parallel iterative methods. These models must be suitable to  homogeneous or heterogeneous parallel architectures.  
 
 \section{Conclusion}
