X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAhmed.git/blobdiff_plain/7b4f492a307bee60f4dfc90adb0aee0bad5f48ed..refs/heads/master:/CHAPITRE_02.tex

diff --git a/CHAPITRE_02.tex b/CHAPITRE_02.tex
index c6a9a29..c3b1245 100644
--- a/CHAPITRE_02.tex
+++ b/CHAPITRE_02.tex
@@ -44,7 +44,7 @@ benchmarks (NPB v3.3) developed by the  NASA~\cite{ref65}.  Our experiments are
 SimGrid/SMPI v3.10~\cite{ref66} over an homogeneous
 distributed memory architecture. 
 
-This chapter is composed of two parts. The first part, the proposed frequency scaling selection algorithm  uses the energy model of the Rauber and RÃ¼nger \cite{ref47} and  is compared to Rauber and RÃ¼nger's method.  The comparison results show that our algorithm gives better energy-time trade-off. In the second part,  a new energy model  that takes into account both the communication and computation times of the MPI programs running over a homogeneous cluster is developed.
+This chapter is composed of two parts. In the first part, the proposed frequency scaling selection algorithm  uses the energy model of  Rauber and RÃ¼nger \cite{ref47} and  is compared to Rauber and RÃ¼nger's method.  The comparison results show that our algorithm gives better energy-time trade-off. In the second part,  a new energy model  that takes into account both the communication and computation times of the MPI programs running over a homogeneous cluster is developed.
 It  also shows the new results obtained using the new energy model. The results are compared to the  ones given by Rauber and RÃ¼nger's energy model.  
 
 
