X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/18cc9b1a86a8bd67b0719242a4a6928526d13bbc..672f1f775e091f7120b3ad28a38dc90f11163105:/CHAPITRE_02.tex?ds=sidebyside

diff --git a/CHAPITRE_02.tex b/CHAPITRE_02.tex
index 130fd0b..11b629d 100644
--- a/CHAPITRE_02.tex
+++ b/CHAPITRE_02.tex
@@ -210,9 +210,9 @@ check if its $n_i$ is decreased to 0 or not. If $n_i$ of a sensor node is 0 (i.e
 
 & \tiny K. Deschinkel et al. (2012)~\cite{ref122} &  & \OK  &   & \OK &  &  & \OK &  & \OK & \OK &  &  &\\
 
-\rot{\rlap{Some Proposed Coverage Protocols in previous literatures}}
 
-& \tiny  A. Gallais et al. (2006)~\cite{ref123} & \OK & & \OK & &  & \OK & \OK &  & \OK &  & \OK & \OK &\\
+
+& \tiny  A. Gallais et al. (2008)~\cite{ref123} & \OK & & \OK & &  & \OK & \OK &  & \OK &  & \OK & \OK &\\
 
 & \tiny  D. Tian and N. D. Georganas (2002)~\cite{ref124} & \OK & & \OK & & & & \OK & & \OK & & \OK &  &\\
 
@@ -232,10 +232,14 @@ check if its $n_i$ is decreased to 0 or not. If $n_i$ of a sensor node is 0 (i.e
 
 & \tiny  J. Lu and T. Suda (2003)~\cite{ref131} & \OK &   &  \OK &   &  &  & \OK &  & \OK &  & \OK &  &\\
 
+
+
 & \tiny  J. Cho et al. (2007)~\cite{ref145}  & \OK &   &  \OK &   &  &  & \OK &  & \OK &  &  &  &\\
 
 & \tiny  V. T. Quang and T. Miyoshi (2008)~\cite{ref146}  & \OK &   & \OK &  & \OK &  & \OK &  & \OK &  & \OK &  &\\
 
+\rot{\rlap{Some Proposed Coverage Protocols in previous literatures}}
+
 & \tiny  D. Dong et al. (2012)~\cite{ref149}  & \OK &  & \OK &  &  &  & \OK &  & \OK &  & \OK &  &\\
 
 & \tiny  B. Wang et al. (2012)~\cite{ref134}  & \OK &  & \OK &  &  &  & \OK &  & \OK &  & \OK &  &\\
