X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/18cc9b1a86a8bd67b0719242a4a6928526d13bbc..672f1f775e091f7120b3ad28a38dc90f11163105:/Thesis.tex?ds=inline

diff --git a/Thesis.tex b/Thesis.tex
index bb527c2..9017b01 100644
--- a/Thesis.tex
+++ b/Thesis.tex
@@ -42,7 +42,7 @@
 \setcounter{page}{1}
 \pagenumbering{arabic}
 
-%\include{CHAPITRE_01}
+\include{CHAPITRE_01}
 
 \include{CHAPITRE_02}
 
