X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/18f4c7343347a82095afb6238a5190e553d2bf0a..0add4a1cb9d6d1a1318de8a5196ded5a533613ac:/Thesis.tex

diff --git a/Thesis.tex b/Thesis.tex
index 9017b01..b190ff5 100644
--- a/Thesis.tex
+++ b/Thesis.tex
@@ -33,11 +33,9 @@
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 %% Introduction gÃ©nÃ©rale
-%\include{INTRODUCTION}
+\include{INTRODUCTION}
 
 \part{Scientific Background}
-%% Architectures de calcul parallÃ¨le
-
 % set the page numbers to be arabic, starting at page 1 %
 \setcounter{page}{1}
 \pagenumbering{arabic}
@@ -48,10 +46,9 @@
 
 \part{Contributions}
 %% 
-%\include{CHAPITRE_03}
+\include{CHAPITRE_03}
 
-%% 
-%\include{CHAPITRE_04}
+\include{CHAPITRE_04}
 
 %% 
 %\include{CHAPITRE_05}
