X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/28fe5f530e0e9ae044a4463fd7eb3646cc5dd04c..f4f5f337524382c18d1b10df1769db7f17d89acc:/ACRONYMS.tex?ds=sidebyside

diff --git a/ACRONYMS.tex b/ACRONYMS.tex
index be974d9..a95c3df 100644
--- a/ACRONYMS.tex
+++ b/ACRONYMS.tex
@@ -1,6 +1,6 @@
 \chapter*{abbreviations \markboth{abbreviations}{abbreviations}}
 \label{chap}
-\addcontentsline{toc}{chapter}{abbreviations}
+\addcontentsline{toc}{chapter}{List of Abbreviations}
 
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 %%                          %%
@@ -53,7 +53,7 @@
 \item[GUI] Graphical User Interface
 \item[NED] NEtwork Description
 \item[ns-2] Network Simulator-2
-\item[OPNET] Optimized Network Engineering tool
+\item[OPNET] Optimized Network Engineering Tool
 \item[GloMoSim]  Global Mobile System Simulator
 \item[SENSE] Sensor Network Simulator and Emulator
 \item[GTSNetS] Georgia Tech Sensor Network Simulator
@@ -79,7 +79,6 @@
 \item[CR] Coverage Ratio
 \item[EC] Energy Consumption
 \item[ASR] Active Sensors Ratio
-\item[] 
 
 \end{abbreviations}
 
