X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/508b0afd303ff3341d65be0960746229924e9863..5b873620b230517c1592c89c4c8dd5dba2818339:/ACRONYMS.tex

diff --git a/ACRONYMS.tex b/ACRONYMS.tex
index a95c3df..c07c9fe 100644
--- a/ACRONYMS.tex
+++ b/ACRONYMS.tex
@@ -58,9 +58,10 @@
 \item[SENSE] Sensor Network Simulator and Emulator
 \item[GTSNetS] Georgia Tech Sensor Network Simulator
 \item[GNU] GNU's Not Unix
+\item[LP] Linear Programming 
 \item[GLPK] GNU Linear Programming Kit
 \item[MPS]  Mathematical Programming System
-\item[COIN-OR] Linear Programming 
+\item[COIN-OR] COmputational INfrastructure for Operations Research 
 \item[BCP]  Branch Cut and Price
 \item[CBC]  COIN-OR Branch and Cut
 \item[OPL] Optimization Programming Language 
