X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/585c6ba024142990d0e8889792b49ca87292c3ee..75414a79b79e596919eb822c0b19b0f3ba3d6364:/ACRONYMS.tex?ds=inline

diff --git a/ACRONYMS.tex b/ACRONYMS.tex
index f30ab04..a95c3df 100644
--- a/ACRONYMS.tex
+++ b/ACRONYMS.tex
@@ -53,7 +53,7 @@
 \item[GUI] Graphical User Interface
 \item[NED] NEtwork Description
 \item[ns-2] Network Simulator-2
-\item[OPNET] Optimized Network Engineering tool
+\item[OPNET] Optimized Network Engineering Tool
 \item[GloMoSim]  Global Mobile System Simulator
 \item[SENSE] Sensor Network Simulator and Emulator
 \item[GTSNetS] Georgia Tech Sensor Network Simulator
