X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/672f1f775e091f7120b3ad28a38dc90f11163105..a19450b98a8865b2c2b11438256bd9e51e0448f7:/CHAPITRE_02.tex?ds=sidebyside

diff --git a/CHAPITRE_02.tex b/CHAPITRE_02.tex
index 11b629d..5b7f45d 100644
--- a/CHAPITRE_02.tex
+++ b/CHAPITRE_02.tex
@@ -238,7 +238,7 @@ check if its $n_i$ is decreased to 0 or not. If $n_i$ of a sensor node is 0 (i.e
 
 & \tiny  V. T. Quang and T. Miyoshi (2008)~\cite{ref146}  & \OK &   & \OK &  & \OK &  & \OK &  & \OK &  & \OK &  &\\
 
-\rot{\rlap{Some Proposed Coverage Protocols in previous literatures}}
+\rot{\rlap{Some Proposed Coverage Protocols in previous literatures}} 
 
 & \tiny  D. Dong et al. (2012)~\cite{ref149}  & \OK &  & \OK &  &  &  & \OK &  & \OK &  & \OK &  &\\
 
