X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/6affbfc29871bae4b2d4c86f66e39ea4f11f02f9..c2ddf8154e250da6224d29d448817b57eb8c13eb:/Thesis.tex

diff --git a/Thesis.tex b/Thesis.tex
index 0ed6750..b190ff5 100644
--- a/Thesis.tex
+++ b/Thesis.tex
@@ -33,11 +33,9 @@
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 %% Introduction gÃ©nÃ©rale
-%\include{INTRODUCTION}
+\include{INTRODUCTION}
 
 \part{Scientific Background}
-%% Architectures de calcul parallÃ¨le
-
 % set the page numbers to be arabic, starting at page 1 %
 \setcounter{page}{1}
 \pagenumbering{arabic}
@@ -47,13 +45,12 @@
 \include{CHAPITRE_02}
 
 \part{Contributions}
-%% Mise en oeuvre de solveurs linÃ©aires creux sur des grappes GPU
-%\include{CHAPITRE_03}
+%% 
+\include{CHAPITRE_03}
 
-%% Mise en oeuvre de solveurs non linÃ©aires creux des problÃ¨mes obstacles sur des grappes GPU
-%\include{CHAPITRE_04}
+\include{CHAPITRE_04}
 
-%% MÃ©thodes parallÃ¨les Ã  deux niveaux
+%% 
 %\include{CHAPITRE_05}
 \part{Conclusions and Perspectives}
 %% Conclusion et perspectives
