X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/6cacb63d8ed60c9822de6be85af0c827783658df..8781fe4746fe3d576c7c37b579c383fa34a1a83f:/CHAPITRE_04.tex?ds=inline

diff --git a/CHAPITRE_04.tex b/CHAPITRE_04.tex
old mode 100755
new mode 100644
index c06ac21..8fc2e39
--- a/CHAPITRE_04.tex
+++ b/CHAPITRE_04.tex
@@ -350,7 +350,7 @@ $w_{U}$ & $|P|^2$
 % is used to refer this table in the text
 \end{table}
 
-Simulations with five  different node densities going from  50 to 250~nodes were
+Simulations with five different node densities going from  50 to 250~nodes were
 performed  considering  each  time  25~randomly generated  networks,  to  obtain
 experimental results  which are relevant. The  nodes are deployed on  a field of
 interest of $(50 \times 25)~m^2 $ in such a way that they cover the field with a
