X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/74764f53c3366325aed2d15bfa3f6e80c1280561..433012874584d03b48d32d4cdba05eeb3b28dbe6:/CHAPITRE_05.tex

diff --git a/CHAPITRE_05.tex b/CHAPITRE_05.tex
index 9afbba1..ff82816 100755
--- a/CHAPITRE_05.tex
+++ b/CHAPITRE_05.tex
@@ -391,7 +391,7 @@ rounds, and thus should extend the network lifetime.
 
 \begin{figure}[ht!]
 \centering
- \includegraphics[scale=0.6] {Figures/ch5/R1/CR.pdf}   
+ \includegraphics[scale=0.8] {Figures/ch5/R1/CR.pdf}   
 \caption{Average coverage ratio for 150 deployed nodes}
 \label{fig3}
 \end{figure} 
@@ -415,7 +415,7 @@ nodes in a more efficient manner.
 
 \begin{figure}[ht!]
 \centering
-\includegraphics[scale=0.6]{Figures/ch5/R1/ASR.pdf}  
+\includegraphics[scale=0.8]{Figures/ch5/R1/ASR.pdf}  
 \caption{Active sensors ratio for 150 deployed nodes}
 \label{fig4}
 \end{figure} 
@@ -436,7 +436,7 @@ still connected.
 
 \begin{figure}[ht!]
 \centering
-\includegraphics[scale=0.6]{Figures/ch5/R1/SR.pdf} 
+\includegraphics[scale=0.8]{Figures/ch5/R1/SR.pdf} 
 \caption{Cumulative percentage of stopped simulation runs for 150 deployed nodes }
 \label{fig6}
 \end{figure} 
@@ -458,9 +458,9 @@ network sizes, for $Lifetime_{95}$ and $Lifetime_{50}$.
 \centering
  %\begin{multicols}{1}
 \centering
-\includegraphics[scale=0.6]{Figures/ch5/R1/EC95.pdf}\\~ ~ ~ ~ ~(a) \\
+\includegraphics[scale=0.8]{Figures/ch5/R1/EC95.pdf}\\~ ~ ~ ~ ~(a) \\
 %\vfill
-\includegraphics[scale=0.6]{Figures/ch5/R1/EC50.pdf}\\~ ~ ~ ~ ~(b)
+\includegraphics[scale=0.8]{Figures/ch5/R1/EC50.pdf}\\~ ~ ~ ~ ~(b)
 
 %\end{multicols} 
 \caption{Energy consumption for (a) $Lifetime_{95}$ and (b) $Lifetime_{50}$}
@@ -493,7 +493,7 @@ seconds (needed to solve optimization problem) for different values of $T$. The
 
 \begin{figure}[ht!]
 \centering
-\includegraphics[scale=0.6]{Figures/ch5/R1/T.pdf}  
+\includegraphics[scale=0.8]{Figures/ch5/R1/T.pdf}  
 \caption{Execution Time (in seconds)}
 \label{fig77}
 \end{figure} 
@@ -535,9 +535,9 @@ linked.
 \centering
 % \begin{multicols}{0}
 \centering
-\includegraphics[scale=0.6]{Figures/ch5/R1/LT95.pdf}\\~ ~ ~ ~ ~(a) \\
+\includegraphics[scale=0.8]{Figures/ch5/R1/LT95.pdf}\\~ ~ ~ ~ ~(a) \\
 %\hfill 
-\includegraphics[scale=0.6]{Figures/ch5/R1/LT50.pdf}\\~ ~ ~ ~ ~(b)
+\includegraphics[scale=0.8]{Figures/ch5/R1/LT50.pdf}\\~ ~ ~ ~ ~(b)
 
 %\end{multicols} 
 \caption{Network lifetime for (a) $Lifetime_{95}$ and (b) $Lifetime_{50}$}
