X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/8cf62d51df224fa888c577f5337674a9e5867ed3..0d01c32e89f707b123f66232afa43e8989f77373:/CHAPITRE_04.tex?ds=sidebyside

diff --git a/CHAPITRE_04.tex b/CHAPITRE_04.tex
index 9538975..2df2e9e 100755
--- a/CHAPITRE_04.tex
+++ b/CHAPITRE_04.tex
@@ -281,7 +281,7 @@ large compared to $W_{\theta}$.
 \section{Simulation Results and Analysis}
 \label{ch4:sec:04}
 
-\subsection{Simulation Framework}
+\subsection{Simulation Framework}  %%% 
 \label{ch4:sec:04:01}
 
 To assess the performance of DiLCO protocol, we have used the discrete event simulator OMNeT++ \cite{ref158} to run different series of simulations. Table~\ref{tablech4} gives the chosen parameters setting.
