X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/ThesisAli.git/blobdiff_plain/b3546ede493fc38b761124b368cd9feb036c16a9..a19450b98a8865b2c2b11438256bd9e51e0448f7:/Thesis.tex?ds=inline

diff --git a/Thesis.tex b/Thesis.tex
index bb527c2..9017b01 100644
--- a/Thesis.tex
+++ b/Thesis.tex
@@ -42,7 +42,7 @@
 \setcounter{page}{1}
 \pagenumbering{arabic}
 
-%\include{CHAPITRE_01}
+\include{CHAPITRE_01}
 
 \include{CHAPITRE_02}
 
