X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/UIC2013.git/blobdiff_plain/8122e0cee2d1c24eb33b2646bb579111dd9abcbb..a0a53567a404570c213a399c92a3e11bd32b7113:/bare_conf.tex?ds=inline

diff --git a/bare_conf.tex b/bare_conf.tex
index a38a894..48f598c 100644
--- a/bare_conf.tex
+++ b/bare_conf.tex
@@ -688,7 +688,7 @@ nodes.   Overall,  to  be  able to  deal  with  very  large  networks,  a
 distributed method is clearly required.
 
 \begin{table}[ht]
-\caption{EXEC. TIME(S) VS. NUMBER OF SENSORS}
+\caption{EXECUTION TIME(S) VS. NUMBER OF SENSORS}
 % title of Table
 \centering
 
