\documentclass[sunil1,ChapterTOCs]{sunil}
\usepackage[utf8]{inputenc}
\usepackage{amssymb}
\usepackage{amsmath}
\usepackage{graphicx}
\usepackage{subfigure}
%\usepackage{epsfig}
\usepackage{makeidx}
\usepackage[sectionbib]{bibunits}
\usepackage{multicol}
\frenchspacing
\tolerance=5000

\include{Chapters/chapter1/preamble}

\makeatletter


\makeatother

\makeindex

\begin{document}


%%bibliography style to adopt
\bibliographyunit[\chapter]
\defaultbibliographystyle{plain}



\title{Designing Scientific Applications on GPUs }

\author{Raphaël Couturier}

\maketitle

\frontmatter
\include{frontmatter/Foreword}
\include{frontmatter/preface}

\listoffigures
\listoftables
\tableofcontents

\mainmatter

\include{Chapters/symbollist}

\setcounter{page}{1}
\part{This is a Part}
\include{Chapters/chapter1/ch1}
\include{Chapters/chapter2/ch2}
%\include{Chapters/chapter3/ch3}

\bibliographystyle{hep}
%%%\bibliography{biblio}

\clearpage
\printindex

\end{document}
