X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/book_gpu.git/blobdiff_plain/0f26b548f3029a96eafd6667024aabe2b36e464b..21ada473e001305cb2a05a34a2da6c2fb1ecd126:/BookGPU/Chapters/chapter7/ch7.tex

diff --git a/BookGPU/Chapters/chapter7/ch7.tex b/BookGPU/Chapters/chapter7/ch7.tex
index e084f01..2b8b30e 100644
--- a/BookGPU/Chapters/chapter7/ch7.tex
+++ b/BookGPU/Chapters/chapter7/ch7.tex
@@ -696,7 +696,7 @@ where $m$ is one of the scalar functions $\phi,u,w$ describing kinematics; $c$ i
 \includegraphics[width=0.45\textwidth]{Chapters/chapter7/figures/lineardispersion_Nx30-HL90-p6_Linear-eps-converted-to.pdf}
 }
 \end{center}
-\caption{The accuracy in phase celerity $c$ determined by \eqref{ch7:errdisp} for small-amplitude (linear) wave.
+\caption[The accuracy in phase celerity $c$ determined by \eqref{ch7:errdisp} for small-amplitude (linear) wave.]{The accuracy in phase celerity $c$ determined by \eqref{ch7:errdisp} for small-amplitude (linear) wave.
 $N_z\in[6,12]$. Sixth order scheme.}
 \label{ch7:figlinear}
 \end{figure}
