X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/book_gpu.git/blobdiff_plain/0f26b548f3029a96eafd6667024aabe2b36e464b..55ce7168c6e69a2462d76c95dc9a5298ceedb04f:/BookGPU/Chapters/chapter12/ch12.tex?ds=sidebyside

diff --git a/BookGPU/Chapters/chapter12/ch12.tex b/BookGPU/Chapters/chapter12/ch12.tex
index 5c0a5b2..4bc95a6 100755
--- a/BookGPU/Chapters/chapter12/ch12.tex
+++ b/BookGPU/Chapters/chapter12/ch12.tex
@@ -19,7 +19,7 @@
 \label{ch12:sec:01}
 Sparse linear systems are used to model many scientific and industrial problems,
 such as the environmental simulations or the industrial processing of the complex or
-non-Newtonian fluids. Moreover, the resolution of these problems often involves the
+nonNewtonian fluids. Moreover, the resolution of these problems often involves the
 solving of such linear systems that are considered the most expensive process in
 terms of execution time and memory space. Therefore, solving sparse linear systems
 must be as efficient as possible in order to deal with problems of ever increasing
