X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/book_gpu.git/blobdiff_plain/17bff40b83bcdcc39769f9e59c70ffae1c525b72..9378973df8e8a9aac4a7c212a7efb7d831bfae94:/BookGPU/Chapters/chapter15/ch15.tex

diff --git a/BookGPU/Chapters/chapter15/ch15.tex b/BookGPU/Chapters/chapter15/ch15.tex
index 64eb771..2d507e4 100644
--- a/BookGPU/Chapters/chapter15/ch15.tex
+++ b/BookGPU/Chapters/chapter15/ch15.tex
@@ -917,7 +917,7 @@ one C2050 (Fermi) GPU, located at
  UPMC (Universit\'e Pierre et Marie Curie, Paris, France). 
 As a remark, the execution times measured on the C2050 would be the same 
 on the C2070 and on  the C2075, the only difference between these GPUs 
-being their memory size and their TDP (Thermal Design Power)\index{TDP (Thermal Design Power)}. 
+being their memory size and their TDP (Thermal Design Power)\index{TDP (thermal design power)}. 
 We emphasize that the execution times correspond to the
 complete propagation for all six energies of the large case (see
 Table~\ref{data-sets}), that is to say to the complete execution of
