X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/book_gpu.git/blobdiff_plain/4932967a1c684dc3f7ed04c19144101278b79972..a79be71669f1b6fa38df1cc606be8e2b39fc4428:/BookGPU/Chapters/chapter16/ch16.tex

diff --git a/BookGPU/Chapters/chapter16/ch16.tex b/BookGPU/Chapters/chapter16/ch16.tex
index bfa5d6c..e7ba3ba 100644
--- a/BookGPU/Chapters/chapter16/ch16.tex
+++ b/BookGPU/Chapters/chapter16/ch16.tex
@@ -1,11 +1,9 @@
-\chapterauthor{X.-X. Liu}{Dept. Electrical Engineering,
-  University  of California, Riverside, CA 92521}
-\chapterauthor{S. X.-D. Tan}{Dept. Electrical Engineering,
-  University  of California, Riverside, CA 92521}
-\chapterauthor{H. Wang}{Univ. of Electronics Science and Technology of China,
+\chapterauthor{Xuexin Liu, Sheldon Xiang-Dong Tan}{Dept. Electrical Engineering,
+  University  of California, Riverside, CA 92521, USA}
+%\chapterauthor{Sheldon Xiang-Dong Tan}{Dept. Electrical Engineering,  University  of California, Riverside, CA 92521}
+\chapterauthor{Hai Wang}{Univ. of Electronics Science and Technology of China,
   Chengdu, Sichuan, China}
-\chapterauthor{H. Yu}{School of Electrical \& Electronic Engineering,
-  Nanyang Technological University, Singapore}
+\chapterauthor{Hao Yu}{School of Electrical \& Electronic Engineering, Nanyang Technological University, Singapore}
 
 %  \thanks{
 %    This research was supported in part by NSF grants under
