X-Git-Url: https://bilbo.iut-bm.univ-fcomte.fr/and/gitweb/book_gpu.git/blobdiff_plain/65f8be28e79668334c6fcbc3a2af46a7c8a2eab0..063fd4437e9bfbefc2f6ed6c932744bb20514751:/BookGPU/Chapters/chapter16/exp.tex?ds=sidebyside

diff --git a/BookGPU/Chapters/chapter16/exp.tex b/BookGPU/Chapters/chapter16/exp.tex
index 7fda02b..a527ba4 100644
--- a/BookGPU/Chapters/chapter16/exp.tex
+++ b/BookGPU/Chapters/chapter16/exp.tex
@@ -84,11 +84,6 @@ produces a envelope matching the original waveform well.
 
 \begin{table}
 \centering
-\caption{CPU and GPU time comparisons (in seconds) for solving Newton update equation
-  with the proposed Gear-2 sensitivity.
-}
-\vspace{0.1in}
-\label{table:circuit}
 {%\normalsize
 \begin{tabular}{@{}c|c|c|c|c|c|c@{}}
 \hline\hline
@@ -102,6 +97,10 @@ Boost-2    & 1093   & 729.5  & 720.8 &  71.0  &  8.5 & 9.9$\times$ \\
 \hline\hline
 \end{tabular}
 }
+\caption{CPU and GPU time comparisons (in seconds) for solving Newton update equation
+  with the proposed Gear-2 sensitivity.
+}
+\label{table:circuit}
 \end{table}
 
 For the comparison  of running time spent in solving
